\begin{tabular}{lllll}
\toprule
{} &             Control &          Stimulated &              MWU &          PRS \\
\midrule
average\_firing\_rate &  21.22 ± 1.17 (147) &  20.20 ± 0.96 (178) &  13472.00, 0.645 &  1.02, 0.494 \\
half\_width          &   0.23 ± 0.01 (147) &   0.23 ± 0.00 (178) &  12839.00, 0.773 &  0.01, 0.456 \\
peak\_to\_trough      &   0.29 ± 0.00 (147) &   0.29 ± 0.00 (178) &  13194.50, 0.895 &  0.00, 0.892 \\
\bottomrule
\end{tabular}
