\begin{tabular}{lllll}
\toprule
{} &            Control &          Stimulated &              MWU &          PRS \\
\midrule
average\_firing\_rate &  9.53 ± 0.37 (491) &  11.42 ± 0.81 (193) &  41822.00, 0.017 &  1.89, 0.013 \\
half\_width          &  0.30 ± 0.00 (491) &   0.29 ± 0.01 (193) &  48255.00, 0.707 &  0.01, 0.384 \\
peak\_to\_trough      &  0.66 ± 0.00 (491) &   0.66 ± 0.01 (193) &  50678.00, 0.156 &  0.00, 0.854 \\
\bottomrule
\end{tabular}
