\begin{tabular}{lllll}
\toprule
{} &             Control &          Stimulated &              MWU &          PRS \\
\midrule
average\_firing\_rate &  10.54 ± 0.37 (529) &  11.86 ± 0.59 (208) &  49606.00, 0.038 &  1.32, 0.053 \\
half\_width          &   0.29 ± 0.00 (529) &   0.29 ± 0.00 (208) &  55575.00, 0.830 &  0.00, 0.986 \\
peak\_to\_trough      &   0.68 ± 0.01 (529) &   0.68 ± 0.01 (208) &  56924.50, 0.463 &  0.00, 0.777 \\
\bottomrule
\end{tabular}
