\begin{tabular}{lllllllllllll}
\toprule
{} &            Theta energy &              Theta peak &              Theta freq &        Theta half width &           Theta vec len &               Theta ang &             Stim energy &         Stim half width &              Stim p max &           Stim strength &            Stim vec len &                Stim ang \\
\midrule
Baseline I                   &  2.9e-01 ± 3.5e-02 (63) &  2.4e-01 ± 2.6e-02 (63) &  7.8e+00 ± 7.0e-02 (63) &  7.0e-01 ± 3.9e-02 (63) &  2.3e-01 ± 1.3e-02 (63) &  3.6e+00 ± 1.3e-01 (63) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
11 Hz                        &  8.7e-02 ± 1.2e-02 (56) &  6.9e-02 ± 6.3e-03 (56) &  7.8e+00 ± 1.3e-01 (56) &  3.5e-01 ± 3.0e-02 (56) &  3.8e-02 ± 3.3e-03 (56) &  3.6e+00 ± 2.3e-01 (56) &  9.7e-02 ± 1.0e-02 (58) &  2.3e-01 ± 8.5e-03 (58) &  4.7e-01 ± 3.2e-02 (58) &  8.9e+00 ± 7.4e-01 (58) &  2.5e-01 ± 1.6e-02 (58) &  3.2e+00 ± 2.5e-01 (58) \\
Baseline II                  &  3.3e-01 ± 3.7e-02 (46) &  2.8e-01 ± 2.6e-02 (46) &  8.1e+00 ± 5.0e-02 (46) &  6.6e-01 ± 5.0e-02 (46) &  2.4e-01 ± 1.6e-02 (46) &  3.7e+00 ± 1.0e-01 (46) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
30 Hz                        &  1.6e-01 ± 5.4e-02 (35) &  1.2e-01 ± 3.7e-02 (35) &  8.3e+00 ± 1.6e-01 (35) &  4.2e-01 ± 6.3e-02 (35) &  1.8e-02 ± 3.1e-03 (35) &  2.6e+00 ± 3.2e-01 (35) &  1.0e-01 ± 1.0e-02 (33) &  2.6e-01 ± 6.0e-03 (33) &  4.3e-01 ± 3.8e-02 (33) &  1.3e+01 ± 1.3e+00 (33) &  2.6e-01 ± 1.8e-02 (33) &  2.5e+00 ± 2.2e-01 (33) \\
LMM Baseline I - 11 Hz       &       6.4e-194, 2.0e-01 &        8.8e-09, 1.8e-01 &       3.3e-01, -2.2e-01 &        5.1e-13, 3.8e-01 &        2.5e-06, 2.0e-01 &        6.4e-01, 1.9e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - Baseline II &       1.8e-01, -5.7e-02 &                     NaN &        6.4e-02, 2.6e-01 &                     NaN &       4.9e-02, -3.9e-02 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - 30 Hz       &        2.6e-01, 1.4e-01 &        5.1e-02, 1.4e-01 &       1.2e-01, -5.4e-01 &        3.1e-02, 3.3e-01 &        4.2e-04, 2.1e-01 &        1.5e-02, 8.0e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - Baseline II      &        9.2e-02, 2.3e-01 &        5.8e-03, 2.0e-01 &        6.8e-01, 1.4e-01 &        6.6e-03, 3.4e-01 &        1.2e-03, 1.8e-01 &        5.6e-01, 2.6e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - 30 Hz            &        5.8e-01, 6.7e-02 &        4.8e-01, 5.4e-02 &        3.4e-01, 4.1e-01 &                     NaN &       2.0e-02, -1.5e-02 &       1.1e-02, -5.1e-01 &        8.0e-01, 8.4e-03 &        3.0e-03, 4.3e-02 &       9.2e-01, -6.2e-03 &        3.0e-01, 3.4e+00 &        7.0e-01, 2.2e-02 &       1.2e-02, -6.6e-01 \\
LMM Baseline II - 30 Hz      &        2.7e-01, 2.1e-01 &        9.2e-02, 1.6e-01 &       3.7e-01, -2.8e-01 &        9.0e-30, 3.9e-01 &        1.1e-06, 1.9e-01 &        5.8e-01, 6.6e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
\bottomrule
\end{tabular}
