\begin{tabular}{lllll}
\toprule
{} &             Control &          Stimulated &              MWU &          PRS \\
\midrule
average\_firing\_rate &  10.54 ± 0.37 (529) &  11.07 ± 0.48 (333) &  85419.00, 0.455 &  0.53, 0.371 \\
half\_width          &   0.29 ± 0.00 (529) &   0.29 ± 0.00 (333) &  91807.00, 0.295 &  0.00, 0.975 \\
peak\_to\_trough      &   0.68 ± 0.01 (529) &   0.69 ± 0.01 (333) &  88899.00, 0.818 &  0.01, 0.502 \\
\bottomrule
\end{tabular}
