\begin{tabular}{lllllllllllll}
\toprule
{} &            Theta energy &              Theta peak &              Theta freq &        Theta half width &           Theta vec len &               Theta ang &             Stim energy &         Stim half width &              Stim p max &           Stim strength &            Stim vec len &                Stim ang \\
\midrule
Baseline I                   &  9.9e-01 ± 1.6e-01 (12) &  5.9e-01 ± 7.2e-02 (12) &  7.9e+00 ± 1.1e-01 (12) &  1.3e+00 ± 1.3e-01 (12) &  3.1e-01 ± 4.6e-02 (12) &  3.3e+00 ± 2.3e-01 (12) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
11 Hz                        &  1.6e-01 ± 3.1e-02 (25) &  9.7e-02 ± 1.4e-02 (25) &  7.9e+00 ± 1.3e-01 (25) &  6.2e-01 ± 1.1e-01 (25) &  2.4e-02 ± 4.6e-03 (25) &  3.5e+00 ± 3.6e-01 (25) &  1.2e-01 ± 1.4e-02 (25) &  2.4e-01 ± 1.0e-02 (25) &  5.4e-01 ± 4.0e-02 (25) &  7.1e+00 ± 7.9e-01 (25) &  2.5e-01 ± 2.6e-02 (25) &  3.7e+00 ± 4.2e-01 (25) \\
Baseline II                  &  1.0e+00 ± 1.7e-01 (17) &  5.4e-01 ± 6.3e-02 (17) &  8.1e+00 ± 8.9e-02 (17) &  1.5e+00 ± 2.1e-01 (17) &  3.2e-01 ± 4.2e-02 (17) &  3.4e+00 ± 6.2e-02 (17) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
30 Hz                        &  1.3e-01 ± 2.1e-02 (32) &  9.5e-02 ± 1.4e-02 (32) &  8.4e+00 ± 1.6e-01 (32) &  6.2e-01 ± 9.9e-02 (32) &  1.3e-02 ± 3.1e-03 (32) &  2.7e+00 ± 2.7e-01 (32) &  1.5e-01 ± 1.6e-02 (32) &  3.3e-01 ± 1.9e-02 (32) &  5.3e-01 ± 4.7e-02 (32) &  1.2e+01 ± 1.9e+00 (32) &  2.3e-01 ± 2.2e-02 (32) &  3.6e+00 ± 3.2e-01 (32) \\
LMM Baseline I - 11 Hz       &        1.4e-05, 8.0e-01 &        4.4e-12, 5.0e-01 &       8.3e-01, -4.8e-02 &                     NaN &        3.1e-10, 2.9e-01 &       8.1e-01, -1.3e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - Baseline II &        6.2e-01, 1.3e-01 &       8.6e-01, -2.0e-02 &        8.9e-01, 9.2e-02 &        3.7e-01, 3.4e-01 &        5.8e-01, 3.9e-02 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - 30 Hz       &        5.8e-10, 8.6e-01 &        7.3e-11, 5.0e-01 &       8.4e-02, -5.2e-01 &        1.7e-04, 6.0e-01 &        2.9e-43, 3.1e-01 &        4.7e-01, 5.4e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - Baseline II      &        1.3e-02, 8.7e-01 &        4.1e-04, 4.5e-01 &        8.5e-01, 5.9e-02 &        5.2e-03, 7.1e-01 &        4.0e-05, 3.0e-01 &       8.4e-01, -1.1e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - 30 Hz            &       1.6e-01, -4.7e-02 &       9.3e-01, -1.9e-03 &        1.8e-01, 4.5e-01 &       4.0e-01, -1.3e-01 &       2.1e-01, -1.1e-02 &       1.6e-01, -8.2e-01 &        3.3e-01, 3.1e-02 &        1.4e-03, 8.1e-02 &                     NaN &        2.0e-01, 3.1e+00 &       6.5e-01, -2.1e-02 &       4.7e-01, -3.8e-01 \\
LMM Baseline II - 30 Hz      &        1.4e-03, 9.0e-01 &        1.5e-04, 4.5e-01 &       4.8e-01, -5.3e-01 &        2.2e-04, 8.5e-01 &        3.7e-06, 3.2e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
\bottomrule
\end{tabular}
