\begin{tabular}{lllllllllllll}
\toprule
{} &            Theta energy &              Theta peak &              Theta freq &        Theta half width &           Theta vec len &               Theta ang &             Stim energy &         Stim half width &              Stim p max &           Stim strength &            Stim vec len &                Stim ang \\
\midrule
Baseline I                   &  2.0e-01 ± 2.6e-02 (63) &  1.7e-01 ± 1.9e-02 (63) &  7.7e+00 ± 7.5e-02 (63) &  6.4e-01 ± 3.8e-02 (63) &  2.0e-01 ± 1.5e-02 (63) &  3.7e+00 ± 1.0e-01 (63) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
11 Hz                        &  9.7e-02 ± 1.6e-02 (56) &  6.9e-02 ± 7.0e-03 (56) &  7.8e+00 ± 1.3e-01 (56) &  4.3e-01 ± 7.6e-02 (56) &  4.0e-02 ± 4.6e-03 (56) &  3.3e+00 ± 2.7e-01 (56) &  8.8e-02 ± 9.1e-03 (58) &  2.2e-01 ± 6.8e-03 (58) &  4.5e-01 ± 3.1e-02 (58) &  9.0e+00 ± 8.9e-01 (58) &  2.2e-01 ± 1.6e-02 (58) &  2.9e+00 ± 2.6e-01 (58) \\
Baseline II                  &  3.3e-01 ± 4.2e-02 (46) &  2.5e-01 ± 2.5e-02 (46) &  8.1e+00 ± 4.4e-02 (46) &  8.2e-01 ± 6.4e-02 (46) &  2.3e-01 ± 1.9e-02 (46) &  4.0e+00 ± 1.1e-01 (46) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
30 Hz                        &  4.3e-02 ± 4.8e-03 (35) &  4.2e-02 ± 4.7e-03 (35) &  7.9e+00 ± 2.0e-01 (35) &  3.0e-01 ± 2.7e-02 (35) &  1.8e-02 ± 2.6e-03 (35) &  3.8e+00 ± 3.1e-01 (35) &  9.1e-02 ± 8.8e-03 (33) &  2.5e-01 ± 4.0e-03 (33) &  3.9e-01 ± 3.3e-02 (33) &  1.3e+01 ± 1.5e+00 (33) &  2.5e-01 ± 1.5e-02 (33) &  2.6e+00 ± 2.4e-01 (33) \\
LMM Baseline I - 11 Hz       &        1.1e-01, 1.3e-01 &        5.3e-03, 1.2e-01 &       9.8e-01, -7.5e-03 &        7.8e-02, 2.7e-01 &        1.6e-03, 1.5e-01 &        2.0e-02, 4.3e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - Baseline II &       1.9e-01, -5.3e-02 &       1.2e-01, -4.2e-02 &        7.6e-02, 2.2e-01 &       6.6e-01, -3.6e-02 &       2.6e-01, -3.2e-02 &        6.9e-01, 1.4e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - 30 Hz       &        5.5e-02, 1.6e-01 &        1.8e-02, 1.4e-01 &       3.7e-01, -2.3e-01 &        1.1e-11, 3.8e-01 &        9.7e-04, 1.8e-01 &        4.7e-01, 3.5e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - Baseline II      &        1.2e-02, 2.3e-01 &        1.1e-02, 1.7e-01 &        7.1e-01, 1.4e-01 &        1.4e-12, 4.2e-01 &        6.3e-04, 1.6e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - 30 Hz            &       5.2e-02, -6.2e-02 &       4.5e-02, -3.2e-02 &        5.5e-01, 2.8e-01 &       3.3e-01, -1.3e-01 &       1.6e-02, -2.7e-02 &        4.0e-01, 2.8e-01 &        8.7e-01, 6.2e-03 &        2.7e-01, 2.8e-02 &       7.5e-01, -3.0e-02 &        1.1e-01, 4.5e+00 &        6.8e-01, 3.0e-02 &       4.9e-01, -4.2e-01 \\
LMM Baseline II - 30 Hz      &        1.9e-02, 2.7e-01 &        2.5e-02, 1.9e-01 &        8.3e-01, 7.0e-02 &        6.4e-04, 4.8e-01 &        4.9e-04, 2.0e-01 &        6.1e-01, 3.0e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
\bottomrule
\end{tabular}
