\begin{tabular}{lrrr}
\toprule
{} &  Baseline I - 11 Hz &  Baseline I - Baseline II &  Baseline II - 30 Hz \\
\midrule
Average rate            &                 NaN &                       NaN &                  NaN \\
Gridness                &          126.684211 &                105.285714 &           102.608696 \\
Information specificity &           70.500000 &                 46.840000 &            29.555556 \\
Max rate                &           89.181818 &                116.187500 &            97.750000 \\
Information rate        &           78.300000 &                 96.333333 &            94.352941 \\
In field mean rate      &           78.692308 &                 86.500000 &            59.647059 \\
Out field mean rate     &           81.555556 &                 79.750000 &            60.000000 \\
Speed score             &            6.923077 &                  7.735849 &             7.684211 \\
Spacing                 &           11.666667 &                  6.129032 &             6.972973 \\
Field area              &            6.916667 &                  8.869565 &             7.831169 \\
\bottomrule
\end{tabular}
