\begin{tabular}{lllll}
\toprule
{} & Baseline I vs baseline II & Baseline I vs stim I & Baseline II vs stim II & Baseline I vs stim II \\
\midrule
Spatial shift                &             526.00, 0.099 &        688.00, 0.718 &          689.00, 0.725 &         276.00, 0.098 \\
Difference in gridness       &             819.00, 0.213 &        841.00, 0.270 &          757.00, 0.769 &         495.00, 0.173 \\
Relative change in max rate  &             777.00, 0.345 &        833.00, 0.251 &          786.00, 0.491 &         543.00, 0.032 \\
Relative change in mean rate &             691.00, 0.936 &        887.00, 0.094 &          649.00, 0.522 &         347.00, 0.551 \\
\bottomrule
\end{tabular}
