\begin{tabular}{lllll}
\toprule
{} &             Control &          Stimulated &              MWU &          PRS \\
\midrule
average\_firing\_rate &  21.83 ± 1.15 (145) &  20.79 ± 0.92 (184) &  13743.00, 0.638 &  1.04, 0.470 \\
half\_width          &   0.23 ± 0.01 (145) &   0.23 ± 0.00 (184) &  12714.00, 0.465 &  0.00, 0.720 \\
peak\_to\_trough      &   0.29 ± 0.00 (145) &   0.29 ± 0.00 (184) &  13281.00, 0.946 &  0.00, 0.839 \\
\bottomrule
\end{tabular}
