\begin{tabular}{lllll}
\toprule
{} &             Control &          Stimulated &               MWU &          PRS \\
\midrule
average\_firing\_rate &  10.54 ± 0.37 (529) &  11.37 ± 0.37 (541) &  135025.00, 0.110 &  0.84, 0.110 \\
half\_width          &   0.29 ± 0.00 (529) &   0.29 ± 0.00 (541) &  147382.00, 0.396 &  0.00, 0.991 \\
peak\_to\_trough      &   0.68 ± 0.01 (529) &   0.68 ± 0.01 (541) &  145823.50, 0.589 &  0.00, 0.747 \\
\bottomrule
\end{tabular}
