\begin{tabular}{lllllllllllll}
\toprule
{} &            Theta energy &              Theta peak &              Theta freq &        Theta half width &           Theta vec len &               Theta ang &             Stim energy &         Stim half width &              Stim p max &           Stim strength &            Stim vec len &                Stim ang \\
\midrule
Baseline I                   &  2.5e-01 ± 3.3e-02 (63) &  2.2e-01 ± 2.5e-02 (63) &  7.6e+00 ± 9.6e-02 (63) &  7.2e-01 ± 3.4e-02 (63) &  2.1e-01 ± 1.2e-02 (63) &  3.9e+00 ± 1.3e-01 (63) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
11 Hz                        &  1.1e-01 ± 1.6e-02 (56) &  8.0e-02 ± 7.9e-03 (56) &  7.7e+00 ± 1.2e-01 (56) &  4.6e-01 ± 7.6e-02 (56) &  4.8e-02 ± 7.3e-03 (56) &  3.5e+00 ± 2.7e-01 (56) &  9.7e-02 ± 1.0e-02 (58) &  3.0e-01 ± 5.1e-02 (58) &  4.5e-01 ± 3.5e-02 (58) &  8.2e+00 ± 9.1e-01 (58) &  2.3e-01 ± 1.5e-02 (58) &  3.1e+00 ± 2.6e-01 (58) \\
Baseline II                  &  2.7e-01 ± 3.2e-02 (46) &  2.0e-01 ± 2.1e-02 (46) &  8.2e+00 ± 7.7e-02 (46) &  7.8e-01 ± 5.9e-02 (46) &  2.0e-01 ± 1.2e-02 (46) &  3.6e+00 ± 1.3e-01 (46) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
30 Hz                        &  3.7e-02 ± 1.5e-03 (35) &  3.5e-02 ± 2.1e-03 (35) &  8.8e+00 ± 1.6e-01 (35) &  2.7e-01 ± 2.9e-02 (35) &  1.7e-02 ± 2.3e-03 (35) &  3.3e+00 ± 3.8e-01 (35) &  1.0e-01 ± 1.0e-02 (33) &  2.6e-01 ± 5.1e-03 (33) &  4.3e-01 ± 3.7e-02 (33) &  1.3e+01 ± 1.1e+00 (33) &  2.7e-01 ± 1.5e-02 (33) &  3.0e+00 ± 2.5e-01 (33) \\
LMM Baseline I - 11 Hz       &                     NaN &        1.5e-13, 1.4e-01 &       9.3e-01, -2.9e-02 &        1.5e-03, 2.8e-01 &                     NaN &        6.2e-01, 2.9e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - Baseline II &       9.8e-01, -1.1e-03 &       3.7e-01, -2.8e-02 &        3.7e-02, 3.2e-01 &       9.7e-01, -5.1e-03 &                     NaN &       7.5e-01, -1.2e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - 30 Hz       &        1.1e-35, 1.9e-01 &        2.7e-09, 1.7e-01 &       1.4e-02, -9.9e-01 &        1.3e-09, 4.5e-01 &        2.6e-12, 1.8e-01 &        1.3e-01, 7.9e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - Baseline II      &        3.3e-02, 1.7e-01 &        1.1e-01, 1.2e-01 &        1.7e-01, 4.6e-01 &        7.4e-03, 3.3e-01 &        1.6e-03, 1.3e-01 &       7.9e-01, -1.7e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - 30 Hz            &       1.4e-02, -6.8e-02 &                     NaN &        1.5e-04, 8.8e-01 &       2.1e-03, -1.8e-01 &       7.2e-02, -3.8e-02 &       7.6e-01, -2.3e-01 &        9.9e-01, 5.8e-04 &       5.9e-01, -5.3e-02 &        9.7e-01, 3.0e-03 &        1.4e-01, 5.0e+00 &        3.5e-01, 4.6e-02 &       4.9e-01, -4.2e-01 \\
LMM Baseline II - 30 Hz      &        1.5e-02, 2.1e-01 &        3.6e-02, 1.5e-01 &       1.4e-01, -4.8e-01 &        1.1e-02, 4.7e-01 &        1.2e-13, 1.7e-01 &        4.1e-01, 6.0e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
\bottomrule
\end{tabular}
