\begin{tabular}{lllllllllllll}
\toprule
{} &             Theta energy &               Theta peak &               Theta freq &         Theta half width &            Theta vec len &                Theta ang &              Stim energy &          Stim half width &               Stim p max &            Stim strength &             Stim vec len &                 Stim ang \\
\midrule
Baseline I                   &  2.8e-01 ± 2.2e-02 (211) &  2.2e-01 ± 1.5e-02 (211) &  7.9e+00 ± 4.7e-02 (211) &  7.2e-01 ± 2.7e-02 (211) &  2.3e-01 ± 1.1e-02 (211) &  3.7e+00 ± 8.2e-02 (211) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
11 Hz                        &  8.2e-02 ± 5.6e-03 (228) &  6.1e-02 ± 3.2e-03 (228) &  7.9e+00 ± 6.0e-02 (228) &  3.7e-01 ± 2.0e-02 (228) &  4.1e-02 ± 2.8e-03 (228) &  3.4e+00 ± 1.3e-01 (228) &  8.8e-02 ± 5.2e-03 (227) &  5.0e-01 ± 1.6e-01 (227) &  4.1e-01 ± 1.8e-02 (228) &  8.9e+00 ± 4.9e-01 (228) &  2.1e-01 ± 8.2e-03 (228) &  3.0e+00 ± 1.4e-01 (228) \\
Baseline II                  &  3.2e-01 ± 2.6e-02 (155) &  2.5e-01 ± 1.7e-02 (155) &  8.0e+00 ± 5.0e-02 (155) &  6.9e-01 ± 3.4e-02 (155) &  2.4e-01 ± 1.3e-02 (155) &  3.5e+00 ± 9.0e-02 (155) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
30 Hz                        &  6.5e-02 ± 6.9e-03 (161) &  5.8e-02 ± 5.5e-03 (161) &  8.3e+00 ± 7.2e-02 (161) &  3.4e-01 ± 2.4e-02 (161) &  2.0e-02 ± 2.2e-03 (161) &  3.0e+00 ± 1.4e-01 (161) &  1.4e-01 ± 6.4e-03 (165) &  3.8e-01 ± 5.2e-02 (165) &  5.4e-01 ± 2.0e-02 (165) &  1.5e+01 ± 9.1e-01 (165) &  3.2e-01 ± 1.1e-02 (165) &  3.4e+00 ± 1.4e-01 (165) \\
LMM Baseline I - 11 Hz       &         5.9e-10, 2.1e-01 &        1.3e-113, 1.8e-01 &        7.3e-01, -6.6e-02 &         9.3e-09, 3.4e-01 &         1.2e-38, 2.0e-01 &         5.3e-01, 1.4e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - Baseline II &         9.4e-02, 5.6e-02 &         1.2e-01, 3.4e-02 &         1.3e-04, 1.7e-01 &         9.8e-01, 2.8e-03 &         7.7e-01, 5.5e-03 &         9.1e-01, 1.6e-02 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - 30 Hz       &         4.0e-13, 2.3e-01 &         1.1e-21, 1.9e-01 &        3.1e-03, -4.8e-01 &         3.1e-13, 3.7e-01 &         1.0e-87, 2.3e-01 &         2.1e-02, 5.4e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - Baseline II      &         2.5e-22, 2.6e-01 &         1.5e-13, 1.9e-01 &         8.7e-01, 2.8e-02 &         4.1e-16, 3.4e-01 &         6.2e-21, 2.0e-01 &        8.4e-01, -6.0e-02 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - 30 Hz            &        1.3e-01, -2.1e-02 &        2.1e-01, -9.5e-03 &         2.0e-04, 4.1e-01 &        5.8e-01, -3.3e-02 &        1.5e-02, -2.1e-02 &        1.3e-01, -3.6e-01 &         3.2e-03, 5.1e-02 &         9.2e-01, 2.0e-02 &         2.2e-02, 1.0e-01 &         7.5e-04, 6.1e+00 &         2.6e-03, 1.0e-01 &         5.7e-01, 3.2e-01 \\
LMM Baseline II - 30 Hz      &         1.4e-10, 2.7e-01 &         2.9e-10, 2.0e-01 &        6.6e-03, -3.7e-01 &         4.4e-19, 3.9e-01 &         1.3e-16, 2.2e-01 &         2.4e-01, 3.3e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
\bottomrule
\end{tabular}
