\begin{tabular}{lllll}
\toprule
{} &             Control &         Stimulated &             MWU &          PRS \\
\midrule
average\_firing\_rate &  21.22 ± 1.17 (147) &  21.62 ± 1.40 (76) &  5429.00, 0.732 &  0.41, 0.822 \\
half\_width          &   0.23 ± 0.01 (147) &   0.23 ± 0.01 (76) &  5540.00, 0.921 &  0.00, 0.846 \\
peak\_to\_trough      &   0.29 ± 0.00 (147) &   0.29 ± 0.01 (76) &  5723.00, 0.765 &  0.00, 0.582 \\
\bottomrule
\end{tabular}
