\begin{tabular}{lllll}
\toprule
{} &             Control &          Stimulated &             MWU &          PRS \\
\midrule
average\_firing\_rate &  21.22 ± 1.17 (147) &  19.13 ± 1.31 (102) &  8043.00, 0.329 &  2.08, 0.236 \\
half\_width          &   0.23 ± 0.01 (147) &   0.23 ± 0.00 (102) &  7299.00, 0.724 &  0.01, 0.299 \\
peak\_to\_trough      &   0.29 ± 0.00 (147) &   0.29 ± 0.00 (102) &  7471.50, 0.964 &  0.00, 0.814 \\
\bottomrule
\end{tabular}
