\begin{tabular}{lllll}
\toprule
{} &            Control &          Stimulated &              MWU &          PRS \\
\midrule
average\_firing\_rate &  9.53 ± 0.37 (491) &  10.04 ± 0.49 (269) &  63173.00, 0.322 &  0.51, 0.406 \\
half\_width          &  0.30 ± 0.00 (491) &   0.30 ± 0.00 (269) &  67834.00, 0.535 &  0.00, 0.655 \\
peak\_to\_trough      &  0.66 ± 0.00 (491) &   0.67 ± 0.01 (269) &  66266.00, 0.938 &  0.01, 0.279 \\
\bottomrule
\end{tabular}
