\begin{tabular}{lllll}
\toprule
{} &            Control &          Stimulated &               MWU &          PRS \\
\midrule
average\_firing\_rate &  9.53 ± 0.37 (491) &  10.62 ± 0.44 (462) &  104995.00, 0.047 &  1.09, 0.053 \\
half\_width          &  0.30 ± 0.00 (491) &   0.30 ± 0.00 (462) &  116089.00, 0.530 &  0.00, 0.425 \\
peak\_to\_trough      &  0.66 ± 0.00 (491) &   0.67 ± 0.01 (462) &  116944.00, 0.407 &  0.00, 0.539 \\
\bottomrule
\end{tabular}
