\begin{tabular}{lllll}
\toprule
{} &        Baseline II &              30 Hz &             MWU &          PRS \\
\midrule
Average rate            &   8.29 ± 0.87 (52) &   7.61 ± 0.87 (38) &   958.00, 0.810 &  0.27, 0.808 \\
Gridness                &   0.54 ± 0.04 (52) &   0.48 ± 0.06 (38) &   914.00, 0.548 &  0.04, 0.598 \\
Sparsity                &   0.63 ± 0.03 (52) &   0.64 ± 0.03 (38) &  1040.00, 0.674 &  0.06, 0.398 \\
Selectivity             &   5.96 ± 0.46 (52) &   6.42 ± 0.60 (38) &  1019.00, 0.803 &  0.20, 0.845 \\
Information specificity &   0.21 ± 0.02 (52) &   0.22 ± 0.03 (38) &   950.00, 0.759 &  0.04, 0.506 \\
Max rate                &  36.27 ± 2.34 (52) &  33.49 ± 1.89 (38) &   943.00, 0.716 &  2.90, 0.565 \\
Information rate        &   1.13 ± 0.08 (52) &   0.98 ± 0.09 (38) &   827.00, 0.190 &  0.07, 0.335 \\
Interspike interval cv  &   2.37 ± 0.09 (52) &   2.23 ± 0.11 (38) &   869.00, 0.333 &  0.17, 0.482 \\
In-field mean rate      &  13.79 ± 1.12 (52) &  12.21 ± 0.98 (38) &   912.00, 0.537 &  1.06, 0.444 \\
Out-field mean rate     &   5.80 ± 0.72 (52) &   5.36 ± 0.73 (38) &   959.00, 0.816 &  0.13, 0.912 \\
Burst event ratio       &   0.20 ± 0.01 (52) &   0.16 ± 0.01 (38) &   676.00, 0.011 &  0.05, 0.009 \\
Specificity             &   0.47 ± 0.03 (52) &   0.48 ± 0.04 (38) &   976.00, 0.925 &  0.00, 0.988 \\
Speed score             &   0.12 ± 0.01 (52) &   0.11 ± 0.01 (38) &   784.00, 0.096 &  0.01, 0.242 \\
\bottomrule
\end{tabular}
