\begin{tabular}{lllll}
\toprule
{} &    Stimulated 30Hz &    Stimulated 11Hz &            MWU &          PRS \\
\midrule
Average rate            &  10.11 ± 1.51 (28) &   9.06 ± 1.21 (32) &  463.00, 0.830 &  0.12, 0.978 \\
Gridness                &   0.28 ± 0.08 (28) &   0.34 ± 0.06 (32) &  402.00, 0.500 &  0.15, 0.330 \\
Sparsity                &   0.68 ± 0.04 (28) &   0.67 ± 0.03 (32) &  479.00, 0.651 &  0.03, 0.493 \\
Selectivity             &   7.47 ± 1.63 (28) &   5.43 ± 0.47 (32) &  449.00, 0.994 &  0.00, 0.999 \\
Information specificity &   0.20 ± 0.03 (28) &   0.19 ± 0.03 (32) &  440.00, 0.912 &  0.01, 0.768 \\
Max rate                &  45.33 ± 6.85 (28) &  35.53 ± 2.50 (32) &  488.00, 0.558 &  1.22, 0.682 \\
Information rate        &   1.04 ± 0.08 (28) &   1.04 ± 0.10 (32) &  475.00, 0.695 &  0.02, 0.775 \\
Interspike interval cv  &   2.28 ± 0.16 (28) &   2.29 ± 0.12 (32) &  411.00, 0.589 &  0.14, 0.659 \\
In-field mean rate      &  14.95 ± 1.71 (28) &  13.87 ± 1.42 (32) &  473.00, 0.717 &  1.02, 0.794 \\
Out-field mean rate     &   7.80 ± 1.35 (28) &   6.52 ± 1.04 (32) &  489.00, 0.548 &  0.17, 0.940 \\
Burst event ratio       &   0.18 ± 0.01 (28) &   0.23 ± 0.01 (32) &  273.00, 0.010 &  0.05, 0.028 \\
Specificity             &   0.43 ± 0.05 (28) &   0.45 ± 0.04 (32) &  400.00, 0.482 &  0.02, 0.570 \\
Speed score             &   0.10 ± 0.02 (28) &   0.09 ± 0.01 (32) &  446.00, 0.982 &  0.01, 0.480 \\
\bottomrule
\end{tabular}
