\begin{tabular}{lllll}
\toprule
{} &             Control &          Stimulated &              MWU &          PRS \\
\midrule
average\_firing\_rate &  10.02 ± 0.37 (478) &  11.36 ± 0.80 (194) &  43124.00, 0.155 &  1.34, 0.085 \\
half\_width          &   0.29 ± 0.00 (478) &   0.29 ± 0.01 (194) &  45885.00, 0.833 &  0.00, 0.804 \\
peak\_to\_trough      &   0.66 ± 0.00 (478) &   0.66 ± 0.01 (194) &  49380.50, 0.186 &  0.00, 0.920 \\
\bottomrule
\end{tabular}
