\begin{tabular}{lllll}
\toprule
{} &             Control &          Stimulated &             MWU &          PRS \\
\midrule
average\_firing\_rate &  21.83 ± 1.15 (145) &  19.85 ± 1.22 (110) &  8502.00, 0.367 &  1.98, 0.244 \\
half\_width          &   0.23 ± 0.01 (145) &   0.23 ± 0.00 (110) &  7419.00, 0.341 &  0.00, 0.547 \\
peak\_to\_trough      &   0.29 ± 0.00 (145) &   0.29 ± 0.00 (110) &  7711.50, 0.652 &  0.00, 0.696 \\
\bottomrule
\end{tabular}
