\begin{tabular}{lllll}
\toprule
{} &             Control &          Stimulated &              MWU &          PRS \\
\midrule
average\_firing\_rate &  10.02 ± 0.37 (478) &  10.15 ± 0.47 (294) &  69504.00, 0.800 &  0.13, 0.832 \\
half\_width          &   0.29 ± 0.00 (478) &   0.30 ± 0.00 (294) &  71749.00, 0.622 &  0.00, 0.563 \\
peak\_to\_trough      &   0.66 ± 0.00 (478) &   0.67 ± 0.01 (294) &  72358.50, 0.487 &  0.01, 0.329 \\
\bottomrule
\end{tabular}
