\begin{tabular}{lllll}
\toprule
{} &           Baseline &              11 Hz &             MWU &          PRS \\
\midrule
Average rate            &   9.82 ± 0.91 (70) &   9.28 ± 0.90 (65) &  2175.00, 0.661 &  0.18, 0.933 \\
Gridness                &   0.54 ± 0.05 (70) &   0.42 ± 0.05 (65) &  1822.00, 0.046 &  0.17, 0.052 \\
Sparsity                &   0.65 ± 0.02 (70) &   0.69 ± 0.02 (65) &  2578.00, 0.183 &  0.06, 0.147 \\
Selectivity             &   5.25 ± 0.35 (70) &   5.43 ± 0.48 (65) &  2214.00, 0.790 &  0.05, 0.961 \\
Information specificity &   0.22 ± 0.03 (70) &   0.19 ± 0.03 (65) &  1888.00, 0.089 &  0.05, 0.020 \\
Max rate                &  36.77 ± 1.96 (70) &  33.16 ± 1.79 (65) &  1971.00, 0.181 &  3.18, 0.250 \\
Information rate        &   1.22 ± 0.06 (70) &   0.89 ± 0.06 (65) &  1431.00, 0.000 &  0.20, 0.006 \\
Interspike interval cv  &   2.37 ± 0.09 (70) &   2.24 ± 0.09 (65) &  2022.00, 0.266 &  0.12, 0.520 \\
In-field mean rate      &  15.52 ± 1.15 (70) &  13.80 ± 1.06 (65) &  2064.00, 0.354 &  0.63, 0.738 \\
Out-field mean rate     &   7.09 ± 0.77 (70) &   7.00 ± 0.80 (65) &  2236.00, 0.865 &  0.01, 0.979 \\
Burst event ratio       &   0.23 ± 0.01 (70) &   0.23 ± 0.01 (65) &  2307.00, 0.890 &  0.01, 0.732 \\
Specificity             &   0.45 ± 0.03 (70) &   0.42 ± 0.03 (65) &  2049.00, 0.321 &  0.01, 0.476 \\
Speed score             &   0.14 ± 0.01 (70) &   0.12 ± 0.01 (65) &  1939.00, 0.140 &  0.03, 0.069 \\
\bottomrule
\end{tabular}
