\begin{tabular}{lllll}
\toprule
{} &             Control &         Stimulated &             MWU &          PRS \\
\midrule
average\_firing\_rate &  21.83 ± 1.15 (145) &  22.18 ± 1.39 (74) &  5241.00, 0.781 &  0.35, 0.860 \\
half\_width          &   0.23 ± 0.01 (145) &   0.23 ± 0.01 (74) &  5295.00, 0.875 &  0.00, 0.998 \\
peak\_to\_trough      &   0.29 ± 0.00 (145) &   0.28 ± 0.00 (74) &  5569.50, 0.646 &  0.01, 0.355 \\
\bottomrule
\end{tabular}
