\begin{tabular}{lllll}
\toprule
{} &             Control &          Stimulated &               MWU &          PRS \\
\midrule
average\_firing\_rate &  10.02 ± 0.37 (478) &  10.63 ± 0.43 (488) &  112628.00, 0.356 &  0.61, 0.280 \\
half\_width          &   0.29 ± 0.00 (478) &   0.30 ± 0.00 (488) &  117634.00, 0.817 &  0.00, 0.610 \\
peak\_to\_trough      &   0.66 ± 0.00 (478) &   0.66 ± 0.01 (488) &  121739.00, 0.239 &  0.01, 0.487 \\
\bottomrule
\end{tabular}
