\begin{tabular}{lllllllllllll}
\toprule
{} &            Theta energy &              Theta peak &              Theta freq &        Theta half width &           Theta vec len &               Theta ang &             Stim energy &         Stim half width &              Stim p max &           Stim strength &            Stim vec len &                Stim ang \\
\midrule
Baseline I                   &  5.3e-01 ± 9.9e-02 (30) &  3.6e-01 ± 5.6e-02 (30) &  7.6e+00 ± 1.0e-01 (30) &  9.9e-01 ± 8.8e-02 (30) &  2.9e-01 ± 3.3e-02 (30) &  3.1e+00 ± 2.2e-01 (30) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
11 Hz                        &  1.8e-01 ± 3.1e-02 (32) &  1.1e-01 ± 1.4e-02 (32) &  8.0e+00 ± 1.7e-01 (32) &  5.8e-01 ± 7.4e-02 (32) &  2.5e-02 ± 3.3e-03 (32) &  1.8e+00 ± 3.2e-01 (32) &  1.1e-01 ± 1.3e-02 (32) &  2.3e-01 ± 9.3e-03 (32) &  5.5e-01 ± 3.5e-02 (32) &  7.1e+00 ± 6.9e-01 (32) &  2.2e-01 ± 2.2e-02 (32) &  1.8e+00 ± 3.0e-01 (32) \\
Baseline II                  &  7.8e-01 ± 1.3e-01 (23) &  4.3e-01 ± 6.1e-02 (23) &  8.0e+00 ± 8.9e-02 (23) &  1.3e+00 ± 1.2e-01 (23) &  3.0e-01 ± 3.5e-02 (23) &  3.2e+00 ± 1.6e-01 (23) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
30 Hz                        &  1.1e-01 ± 3.9e-02 (12) &  7.3e-02 ± 2.5e-02 (12) &  8.5e+00 ± 1.6e-01 (12) &  4.2e-01 ± 9.5e-02 (12) &  1.7e-02 ± 4.1e-03 (12) &  1.9e+00 ± 4.9e-01 (12) &  1.9e-01 ± 2.8e-02 (12) &  3.9e-01 ± 1.1e-01 (12) &  6.3e-01 ± 8.5e-02 (12) &  1.7e+01 ± 3.1e+00 (12) &  3.8e-01 ± 5.3e-02 (12) &  3.4e+00 ± 4.4e-01 (12) \\
LMM Baseline I - 11 Hz       &        9.3e-02, 4.4e-01 &        2.8e-03, 3.4e-01 &       2.1e-02, -5.9e-01 &        2.8e-01, 2.6e-01 &        5.2e-08, 2.8e-01 &        1.4e-01, 1.2e+00 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - Baseline II &        5.4e-01, 1.7e-01 &        8.3e-01, 2.6e-02 &        1.7e-01, 3.4e-01 &        2.1e-01, 2.5e-01 &       8.3e-01, -2.5e-02 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - 30 Hz       &        2.7e-01, 5.1e-01 &        1.7e-01, 3.3e-01 &       1.1e-03, -6.9e-01 &        3.4e-01, 5.1e-01 &        8.1e-03, 2.9e-01 &        4.3e-01, 7.7e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - Baseline II      &        4.5e-03, 6.2e-01 &        9.2e-02, 3.7e-01 &       8.5e-01, -1.3e-01 &        5.3e-03, 6.2e-01 &        2.0e-08, 2.9e-01 &        5.5e-01, 9.9e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - 30 Hz            &       5.8e-01, -9.4e-02 &       5.5e-01, -4.1e-02 &        2.4e-01, 8.6e-01 &       7.2e-01, -2.0e-01 &                     NaN &       9.4e-01, -1.2e-01 &        6.6e-01, 3.8e-02 &        3.4e-01, 6.7e-02 &       8.8e-01, -3.6e-02 &        9.0e-02, 1.1e+01 &        4.0e-01, 1.1e-01 &        5.6e-01, 9.3e-01 \\
LMM Baseline II - 30 Hz      &                     NaN &        7.3e-01, 3.9e-01 &                     NaN &        3.7e-03, 9.1e-01 &        6.5e-07, 3.4e-01 &        4.0e-01, 1.1e+00 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
\bottomrule
\end{tabular}
