\begin{tabular}{lllllllllllll}
\toprule
{} &             Theta energy &               Theta peak &               Theta freq &         Theta half width &            Theta vec len &                Theta ang &              Stim energy &          Stim half width &               Stim p max &            Stim strength &             Stim vec len &                 Stim ang \\
\midrule
Baseline I                   &  3.8e-01 ± 2.7e-02 (211) &  2.7e-01 ± 1.6e-02 (211) &  7.9e+00 ± 4.6e-02 (211) &  7.9e-01 ± 3.1e-02 (211) &  2.7e-01 ± 1.2e-02 (211) &  3.5e+00 ± 6.5e-02 (211) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
11 Hz                        &  1.2e-01 ± 7.5e-03 (227) &  8.3e-02 ± 4.3e-03 (227) &  7.9e+00 ± 5.8e-02 (227) &  4.8e-01 ± 3.2e-02 (227) &  4.1e-02 ± 4.1e-03 (227) &  3.1e+00 ± 1.3e-01 (227) &  1.0e-01 ± 6.2e-03 (226) &  4.6e-01 ± 1.0e-01 (226) &  4.5e-01 ± 1.6e-02 (227) &  7.6e+00 ± 4.2e-01 (227) &  2.5e-01 ± 8.6e-03 (227) &  3.1e+00 ± 1.4e-01 (227) \\
Baseline II                  &  3.9e-01 ± 3.1e-02 (154) &  2.7e-01 ± 1.9e-02 (154) &  8.1e+00 ± 4.7e-02 (154) &  8.0e-01 ± 3.6e-02 (154) &  2.7e-01 ± 1.4e-02 (154) &  3.5e+00 ± 7.4e-02 (154) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
30 Hz                        &  7.3e-02 ± 5.4e-03 (161) &  6.1e-02 ± 3.9e-03 (161) &  8.1e+00 ± 7.2e-02 (161) &  3.7e-01 ± 2.5e-02 (161) &  1.8e-02 ± 1.3e-03 (161) &  3.2e+00 ± 1.3e-01 (161) &  1.4e-01 ± 6.6e-03 (165) &  3.3e-01 ± 1.7e-02 (165) &  5.4e-01 ± 2.1e-02 (165) &  1.3e+01 ± 7.7e-01 (165) &  3.2e-01 ± 1.1e-02 (165) &  3.1e+00 ± 1.4e-01 (165) \\
LMM Baseline I - 11 Hz       &         1.8e-11, 2.6e-01 &         5.9e-30, 2.0e-01 &        1.0e+00, -8.4e-04 &         5.5e-04, 3.4e-01 &         5.0e-38, 2.3e-01 &         2.5e-02, 4.5e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - Baseline II &         7.1e-01, 1.5e-02 &         8.8e-01, 6.2e-03 &                      NaN &         7.1e-01, 2.9e-02 &        7.5e-01, -3.9e-03 &        1.6e-01, -7.7e-02 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - 30 Hz       &         1.3e-12, 3.2e-01 &         7.7e-23, 2.3e-01 &        1.7e-01, -2.5e-01 &         4.0e-07, 4.3e-01 &         3.2e-45, 2.5e-01 &         2.7e-02, 2.9e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - Baseline II      &         7.3e-16, 2.8e-01 &         9.6e-14, 2.0e-01 &         1.5e-01, 2.5e-01 &         3.7e-09, 3.6e-01 &         1.3e-45, 2.3e-01 &         2.0e-01, 3.0e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - 30 Hz            &        7.8e-03, -4.9e-02 &        1.9e-02, -2.4e-02 &         2.2e-02, 2.3e-01 &        9.0e-02, -1.2e-01 &        3.9e-04, -1.7e-02 &         4.8e-01, 1.5e-01 &         8.8e-02, 3.3e-02 &         6.8e-01, 5.4e-02 &         2.9e-01, 6.8e-02 &         1.4e-06, 5.7e+00 &         1.3e-02, 7.4e-02 &         9.2e-01, 2.6e-02 \\
LMM Baseline II - 30 Hz      &         6.6e-17, 3.3e-01 &         1.1e-72, 2.2e-01 &         9.2e-01, 1.7e-02 &         4.8e-19, 4.6e-01 &         1.2e-38, 2.5e-01 &         4.8e-01, 1.5e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
\bottomrule
\end{tabular}
