\begin{tabular}{lllllllllllll}
\toprule
{} &             Theta energy &               Theta peak &               Theta freq &         Theta half width &            Theta vec len &                Theta ang &              Stim energy &          Stim half width &               Stim p max &            Stim strength &             Stim vec len &                 Stim ang \\
\midrule
Baseline I                   &  3.4e-01 ± 2.2e-02 (270) &  2.6e-01 ± 1.4e-02 (270) &  7.9e+00 ± 3.8e-02 (270) &  7.7e-01 ± 2.5e-02 (270) &  2.5e-01 ± 9.6e-03 (270) &  3.6e+00 ± 5.6e-02 (270) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
11 Hz                        &  1.1e-01 ± 6.6e-03 (281) &  8.1e-02 ± 3.7e-03 (281) &  7.9e+00 ± 5.3e-02 (281) &  4.6e-01 ± 2.8e-02 (281) &  3.9e-02 ± 3.0e-03 (281) &  3.2e+00 ± 1.2e-01 (281) &  1.0e-01 ± 5.5e-03 (282) &  4.1e-01 ± 8.6e-02 (282) &  4.6e-01 ± 1.5e-02 (283) &  7.8e+00 ± 3.6e-01 (283) &  2.5e-01 ± 7.4e-03 (283) &  3.0e+00 ± 1.2e-01 (283) \\
Baseline II                  &  3.6e-01 ± 2.6e-02 (196) &  2.6e-01 ± 1.6e-02 (196) &  8.1e+00 ± 4.0e-02 (196) &  7.6e-01 ± 3.0e-02 (196) &  2.5e-01 ± 1.1e-02 (196) &  3.5e+00 ± 6.8e-02 (196) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
30 Hz                        &  7.3e-02 ± 7.0e-03 (190) &  6.1e-02 ± 4.8e-03 (190) &  8.1e+00 ± 6.7e-02 (190) &  3.5e-01 ± 2.1e-02 (190) &  1.7e-02 ± 1.2e-03 (190) &  3.2e+00 ± 1.2e-01 (190) &  1.4e-01 ± 5.9e-03 (192) &  3.2e-01 ± 1.5e-02 (192) &  5.3e-01 ± 1.9e-02 (192) &  1.3e+01 ± 6.8e-01 (192) &  3.2e-01 ± 1.0e-02 (192) &  3.0e+00 ± 1.2e-01 (192) \\
LMM Baseline I - 11 Hz       &         5.3e-12, 2.4e-01 &         5.5e-49, 1.9e-01 &        9.7e-01, -6.1e-03 &         8.5e-05, 3.4e-01 &         1.6e-23, 2.1e-01 &         1.8e-02, 4.1e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - Baseline II &         8.4e-01, 6.2e-03 &        8.9e-01, -3.6e-03 &         8.4e-03, 2.4e-01 &         8.8e-01, 6.1e-03 &        1.6e-01, -1.3e-02 &        7.3e-01, -4.5e-02 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - 30 Hz       &         2.2e-09, 2.8e-01 &         1.0e-18, 2.1e-01 &        1.3e-01, -2.9e-01 &         8.9e-05, 4.4e-01 &         3.3e-28, 2.3e-01 &         6.2e-03, 3.3e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - Baseline II      &         2.4e-09, 2.6e-01 &         3.1e-12, 1.9e-01 &         1.6e-01, 2.5e-01 &         9.9e-13, 3.5e-01 &         4.3e-14, 2.1e-01 &         1.4e-01, 2.6e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - 30 Hz            &        7.3e-03, -4.5e-02 &        1.8e-02, -2.0e-02 &         1.8e-02, 2.6e-01 &        6.3e-02, -1.1e-01 &        3.0e-09, -1.5e-02 &         7.5e-01, 6.6e-02 &         1.3e-01, 3.3e-02 &         5.9e-01, 4.9e-02 &         4.0e-01, 4.8e-02 &         8.3e-02, 5.3e+00 &         3.1e-02, 7.0e-02 &        8.9e-01, -3.1e-02 \\
LMM Baseline II - 30 Hz      &         6.3e-07, 2.9e-01 &         2.3e-09, 2.1e-01 &        8.7e-01, -2.8e-02 &         1.7e-23, 4.5e-01 &         1.6e-32, 2.3e-01 &         2.5e-01, 2.1e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
\bottomrule
\end{tabular}
