\begin{tabular}{lllllllllllll}
\toprule
{} &             Theta energy &               Theta peak &               Theta freq &         Theta half width &            Theta vec len &                Theta ang &              Stim energy &          Stim half width &               Stim p max &            Stim strength &             Stim vec len &                 Stim ang \\
\midrule
Baseline I                   &  2.9e-01 ± 2.0e-02 (270) &  2.3e-01 ± 1.3e-02 (270) &  7.8e+00 ± 4.0e-02 (270) &  7.3e-01 ± 2.3e-02 (270) &  2.2e-01 ± 9.5e-03 (270) &  3.5e+00 ± 6.4e-02 (270) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
11 Hz                        &  1.2e-01 ± 7.5e-03 (282) &  8.1e-02 ± 4.1e-03 (282) &  7.8e+00 ± 5.3e-02 (282) &  4.4e-01 ± 2.3e-02 (282) &  4.4e-02 ± 3.4e-03 (282) &  3.3e+00 ± 1.2e-01 (282) &  1.0e-01 ± 7.5e-03 (284) &  4.8e-01 ± 1.0e-01 (284) &  4.4e-01 ± 1.5e-02 (284) &  7.9e+00 ± 4.1e-01 (284) &  2.4e-01 ± 7.6e-03 (284) &  3.0e+00 ± 1.2e-01 (284) \\
Baseline II                  &  3.3e-01 ± 2.5e-02 (197) &  2.4e-01 ± 1.6e-02 (197) &  8.1e+00 ± 4.3e-02 (197) &  7.1e-01 ± 2.9e-02 (197) &  2.3e-01 ± 1.1e-02 (197) &  3.5e+00 ± 7.6e-02 (197) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
30 Hz                        &  6.3e-02 ± 6.1e-03 (190) &  5.7e-02 ± 4.6e-03 (190) &  8.3e+00 ± 6.4e-02 (190) &  3.4e-01 ± 2.1e-02 (190) &  1.9e-02 ± 1.4e-03 (190) &  3.1e+00 ± 1.3e-01 (190) &  1.3e-01 ± 5.9e-03 (192) &  3.3e-01 ± 2.2e-02 (192) &  5.1e-01 ± 1.9e-02 (192) &  1.4e+01 ± 7.7e-01 (192) &  3.1e-01 ± 9.4e-03 (192) &  2.8e+00 ± 1.2e-01 (192) \\
LMM Baseline I - 11 Hz       &         6.3e-05, 1.9e-01 &         5.5e-12, 1.6e-01 &        7.1e-01, -5.7e-02 &         3.5e-06, 3.2e-01 &         9.0e-12, 1.8e-01 &         4.4e-01, 2.4e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - Baseline II &         5.2e-01, 2.5e-02 &         7.9e-01, 8.0e-03 &         9.6e-03, 2.8e-01 &        7.7e-01, -1.0e-02 &        7.2e-01, -4.4e-03 &        7.6e-01, -5.6e-02 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - 30 Hz       &         1.1e-04, 2.4e-01 &         1.1e-12, 1.8e-01 &        2.7e-03, -4.6e-01 &         2.9e-09, 4.1e-01 &         7.0e-12, 2.0e-01 &         1.0e-01, 3.1e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - Baseline II      &         5.7e-08, 2.3e-01 &         6.5e-08, 1.7e-01 &         1.0e-01, 2.4e-01 &         8.5e-14, 3.2e-01 &         5.1e-16, 1.9e-01 &         6.6e-01, 1.4e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - 30 Hz            &        3.1e-03, -5.3e-02 &        4.9e-03, -2.5e-02 &         4.4e-07, 4.0e-01 &        8.6e-02, -1.1e-01 &        6.5e-03, -2.5e-02 &                      NaN &         8.1e-04, 3.0e-02 &        2.3e-01, -1.3e-01 &         2.0e-01, 6.9e-02 &         8.6e-07, 5.7e+00 &         1.5e-02, 6.9e-02 &                      NaN \\
LMM Baseline II - 30 Hz      &         9.8e-07, 2.7e-01 &         6.5e-08, 1.9e-01 &        1.9e-01, -1.7e-01 &         1.3e-09, 4.0e-01 &         2.9e-25, 2.1e-01 &         3.5e-01, 2.2e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
\bottomrule
\end{tabular}
