\begin{tabular}{lllllllllllll}
\toprule
{} &            Theta energy &              Theta peak &              Theta freq &        Theta half width &           Theta vec len &               Theta ang &             Stim energy &         Stim half width &              Stim p max &           Stim strength &            Stim vec len &                Stim ang \\
\midrule
Baseline I                   &  4.5e-01 ± 9.2e-02 (30) &  3.2e-01 ± 5.4e-02 (30) &  7.6e+00 ± 1.3e-01 (30) &  9.3e-01 ± 7.4e-02 (30) &  2.5e-01 ± 3.5e-02 (30) &  2.7e+00 ± 2.4e-01 (30) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
11 Hz                        &  1.7e-01 ± 3.1e-02 (32) &  1.1e-01 ± 1.4e-02 (32) &  8.0e+00 ± 1.6e-01 (32) &  4.7e-01 ± 8.4e-02 (32) &  6.2e-02 ± 2.2e-02 (32) &  2.0e+00 ± 3.4e-01 (32) &  1.3e-01 ± 1.6e-02 (32) &  3.3e-01 ± 5.0e-02 (32) &  5.2e-01 ± 5.0e-02 (32) &  5.6e+00 ± 5.0e-01 (32) &  1.9e-01 ± 2.0e-02 (32) &  2.0e+00 ± 2.7e-01 (32) \\
Baseline II                  &  6.7e-01 ± 1.2e-01 (23) &  3.9e-01 ± 6.0e-02 (23) &  7.9e+00 ± 6.1e-02 (23) &  1.1e+00 ± 1.3e-01 (23) &  2.8e-01 ± 3.2e-02 (23) &  3.4e+00 ± 1.4e-01 (23) &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
30 Hz                        &  7.9e-02 ± 2.9e-02 (12) &  6.7e-02 ± 2.0e-02 (12) &  9.0e+00 ± 1.3e-01 (12) &  3.7e-01 ± 6.7e-02 (12) &  2.1e-02 ± 5.8e-03 (12) &  1.7e+00 ± 3.5e-01 (12) &  2.0e-01 ± 2.7e-02 (12) &  3.3e-01 ± 1.2e-02 (12) &  6.7e-01 ± 7.7e-02 (12) &  2.0e+01 ± 4.3e+00 (12) &  3.7e-01 ± 4.4e-02 (12) &  3.9e+00 ± 5.1e-01 (12) \\
LMM Baseline I - 11 Hz       &        1.8e-01, 3.7e-01 &        4.9e-02, 2.6e-01 &       3.9e-02, -7.8e-01 &        2.7e-01, 3.6e-01 &        9.1e-02, 2.5e-01 &        2.9e-01, 8.5e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - Baseline II &        5.9e-01, 1.7e-01 &        8.0e-01, 3.1e-02 &        2.8e-01, 3.1e-01 &        8.0e-01, 8.9e-02 &                     NaN &        1.1e-01, 5.3e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM Baseline I - 30 Hz       &        2.4e-01, 4.5e-01 &        1.9e-01, 2.9e-01 &       1.5e-02, -1.3e+00 &        1.1e-01, 5.3e-01 &        1.9e-02, 2.5e-01 &        6.2e-01, 8.8e-01 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - Baseline II      &        1.1e-01, 5.1e-01 &        2.9e-02, 3.0e-01 &       2.1e-03, -2.6e-01 &        3.3e-01, 3.3e-01 &        1.8e-02, 2.1e-01 &        1.4e-01, 1.3e+00 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
LMM 11 Hz - 30 Hz            &       6.2e-01, -1.2e-01 &       6.4e-01, -4.5e-02 &        2.8e-02, 4.7e-01 &       7.5e-01, -1.9e-01 &       5.2e-01, -4.1e-02 &       6.7e-01, -4.4e-01 &        5.0e-01, 4.0e-02 &       7.4e-01, -3.1e-02 &        8.9e-01, 1.9e-02 &        9.0e-03, 1.4e+01 &        3.6e-01, 1.3e-01 &        4.7e-01, 9.0e-01 \\
LMM Baseline II - 30 Hz      &        3.3e-01, 6.6e-01 &        2.3e-01, 3.6e-01 &                     NaN &        8.8e-02, 7.7e-01 &        8.9e-10, 2.8e-01 &        5.8e-01, 1.3e+00 &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN &                     NaN \\
\bottomrule
\end{tabular}
