\begin{tabular}{lllllllllllll}
\toprule
{} &             Theta energy &               Theta peak &               Theta freq &         Theta half width &            Theta vec len &                Theta ang &              Stim energy &          Stim half width &               Stim p max &            Stim strength &             Stim vec len &                 Stim ang \\
\midrule
Baseline I                   &  2.6e-01 ± 1.8e-02 (270) &  2.1e-01 ± 1.2e-02 (270) &  7.9e+00 ± 4.0e-02 (270) &  7.0e-01 ± 2.3e-02 (270) &  2.2e-01 ± 9.0e-03 (270) &  3.7e+00 ± 6.7e-02 (270) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
11 Hz                        &  8.1e-02 ± 5.1e-03 (282) &  6.1e-02 ± 2.9e-03 (282) &  7.9e+00 ± 5.4e-02 (282) &  3.7e-01 ± 1.9e-02 (282) &  4.1e-02 ± 2.4e-03 (282) &  3.4e+00 ± 1.2e-01 (282) &  8.7e-02 ± 4.5e-03 (283) &  4.1e-01 ± 1.2e-01 (283) &  4.2e-01 ± 1.6e-02 (284) &  9.0e+00 ± 4.3e-01 (284) &  2.1e-01 ± 7.3e-03 (284) &  3.0e+00 ± 1.2e-01 (284) \\
Baseline II                  &  2.9e-01 ± 2.2e-02 (197) &  2.3e-01 ± 1.4e-02 (197) &  8.0e+00 ± 4.2e-02 (197) &  6.7e-01 ± 2.9e-02 (197) &  2.2e-01 ± 1.1e-02 (197) &  3.6e+00 ± 7.9e-02 (197) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
30 Hz                        &  6.0e-02 ± 6.0e-03 (190) &  5.5e-02 ± 4.9e-03 (190) &  8.2e+00 ± 7.0e-02 (190) &  3.2e-01 ± 2.0e-02 (190) &  1.9e-02 ± 1.8e-03 (190) &  3.1e+00 ± 1.3e-01 (190) &  1.4e-01 ± 5.8e-03 (192) &  3.6e-01 ± 4.4e-02 (192) &  5.2e-01 ± 1.8e-02 (192) &  1.5e+01 ± 8.3e-01 (192) &  3.1e-01 ± 9.5e-03 (192) &  3.2e+00 ± 1.3e-01 (192) \\
LMM Baseline I - 11 Hz       &         5.4e-08, 1.9e-01 &         9.7e-24, 1.6e-01 &        6.9e-01, -7.4e-02 &         7.8e-08, 3.4e-01 &         8.5e-20, 1.8e-01 &         2.1e-01, 2.3e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - Baseline II &         5.4e-01, 2.7e-02 &         8.4e-01, 8.0e-03 &         1.2e-01, 1.5e-01 &        8.5e-01, -9.5e-03 &        6.2e-01, -9.3e-03 &         7.0e-01, 4.2e-02 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - 30 Hz       &         3.9e-09, 2.1e-01 &         1.1e-28, 1.8e-01 &        1.4e-03, -4.4e-01 &         8.5e-12, 3.8e-01 &         8.0e-25, 2.0e-01 &         1.9e-03, 4.7e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - Baseline II      &         5.3e-06, 2.2e-01 &         1.2e-07, 1.7e-01 &         7.6e-01, 6.7e-02 &         1.0e-22, 3.4e-01 &         3.9e-10, 1.8e-01 &         7.6e-01, 7.0e-02 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - 30 Hz            &        3.4e-01, -2.5e-02 &        4.2e-02, -1.2e-02 &         5.4e-03, 3.5e-01 &        4.9e-01, -4.3e-02 &        6.4e-03, -2.2e-02 &        2.1e-01, -2.5e-01 &         8.7e-03, 4.8e-02 &         7.5e-01, 4.8e-02 &         6.9e-02, 8.9e-02 &         7.7e-03, 6.3e+00 &         6.2e-03, 1.0e-01 &         7.6e-01, 1.7e-01 \\
LMM Baseline II - 30 Hz      &         1.0e-06, 2.4e-01 &         1.7e-05, 1.8e-01 &        4.7e-03, -2.8e-01 &         1.7e-09, 3.6e-01 &         9.1e-14, 2.0e-01 &         2.4e-04, 3.3e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
\bottomrule
\end{tabular}
