\begin{tabular}{lllll}
\toprule
{} & Baseline I vs baseline II & Baseline I vs stim I & Baseline II vs stim II & Baseline I vs stim II \\
\midrule
Spatial shift                &               0.00, 0.186 &          0.00, 0.887 &            0.00, 0.572 &           0.00, 0.240 \\
Difference in gridness       &               0.07, 0.220 &          0.20, 0.003 &            0.05, 0.474 &           0.31, 0.001 \\
Relative change in max rate  &               0.12, 0.138 &          0.03, 0.726 &            0.05, 0.579 &           0.20, 0.038 \\
Relative change in mean rate &               0.04, 0.417 &          0.13, 0.005 &            0.01, 0.689 &           0.02, 0.711 \\
\bottomrule
\end{tabular}
