\begin{tabular}{lllll}
\toprule
{} &            Control &         Stimulated &             MWU &          PRS \\
\midrule
average\_firing\_rate &  25.34 ± 1.50 (94) &  24.10 ± 1.93 (47) &  2333.00, 0.589 &  1.25, 0.622 \\
half\_width          &   0.22 ± 0.01 (94) &   0.23 ± 0.01 (47) &  2057.00, 0.508 &  0.01, 0.594 \\
peak\_to\_trough      &   0.28 ± 0.00 (94) &   0.28 ± 0.01 (47) &  2212.00, 0.991 &  0.00, 0.831 \\
\bottomrule
\end{tabular}
