\begin{tabular}{lllll}
\toprule
{} &            Control &         Stimulated &             MWU &          PRS \\
\midrule
average\_firing\_rate &  25.34 ± 1.50 (94) &  21.17 ± 1.64 (70) &  3843.00, 0.066 &  4.17, 0.066 \\
half\_width          &   0.22 ± 0.01 (94) &   0.21 ± 0.00 (70) &  2961.00, 0.275 &  0.00, 0.886 \\
peak\_to\_trough      &   0.28 ± 0.00 (94) &   0.29 ± 0.01 (70) &  2923.50, 0.224 &  0.01, 0.431 \\
\bottomrule
\end{tabular}
