\begin{tabular}{lllll}
\toprule
{} &            Control &          Stimulated &             MWU &          PRS \\
\midrule
average\_firing\_rate &  25.34 ± 1.50 (94) &  22.35 ± 1.25 (117) &  6176.00, 0.125 &  3.00, 0.125 \\
half\_width          &   0.22 ± 0.01 (94) &   0.22 ± 0.01 (117) &  5018.00, 0.276 &  0.00, 0.755 \\
peak\_to\_trough      &   0.28 ± 0.00 (94) &   0.28 ± 0.00 (117) &  5135.50, 0.410 &  0.00, 0.681 \\
\bottomrule
\end{tabular}
