\begin{tabular}{lllllllllllll}
\toprule
{} &             Theta energy &               Theta peak &               Theta freq &         Theta half width &            Theta vec len &                Theta ang &              Stim energy &          Stim half width &               Stim p max &            Stim strength &             Stim vec len &                 Stim ang \\
\midrule
Baseline I                   &  3.0e-01 ± 2.5e-02 (211) &  2.3e-01 ± 1.6e-02 (211) &  7.8e+00 ± 4.2e-02 (211) &  7.2e-01 ± 2.8e-02 (211) &  2.3e-01 ± 1.2e-02 (211) &  3.4e+00 ± 7.3e-02 (211) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
11 Hz                        &  1.2e-01 ± 8.5e-03 (228) &  8.1e-02 ± 4.6e-03 (228) &  7.9e+00 ± 5.8e-02 (228) &  4.4e-01 ± 2.5e-02 (228) &  4.6e-02 ± 4.3e-03 (228) &  3.2e+00 ± 1.3e-01 (228) &  1.1e-01 ± 9.7e-03 (228) &  5.4e-01 ± 1.3e-01 (228) &  4.3e-01 ± 1.7e-02 (228) &  7.7e+00 ± 4.4e-01 (228) &  2.4e-01 ± 8.8e-03 (228) &  3.0e+00 ± 1.3e-01 (228) \\
Baseline II                  &  3.5e-01 ± 3.0e-02 (155) &  2.6e-01 ± 1.8e-02 (155) &  8.1e+00 ± 4.7e-02 (155) &  7.5e-01 ± 3.3e-02 (155) &  2.5e-01 ± 1.3e-02 (155) &  3.4e+00 ± 8.6e-02 (155) &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
30 Hz                        &  7.0e-02 ± 7.5e-03 (161) &  6.1e-02 ± 5.3e-03 (161) &  8.2e+00 ± 6.8e-02 (161) &  3.6e-01 ± 2.5e-02 (161) &  2.0e-02 ± 1.7e-03 (161) &  3.1e+00 ± 1.4e-01 (161) &  1.4e-01 ± 6.6e-03 (165) &  3.4e-01 ± 2.6e-02 (165) &  5.3e-01 ± 2.1e-02 (165) &  1.4e+01 ± 8.8e-01 (165) &  3.1e-01 ± 1.1e-02 (165) &  2.8e+00 ± 1.4e-01 (165) \\
LMM Baseline I - 11 Hz       &         7.8e-04, 2.0e-01 &         8.6e-05, 1.6e-01 &        5.7e-01, -1.1e-01 &         1.5e-04, 3.1e-01 &         7.2e-22, 2.0e-01 &         3.7e-01, 2.4e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - Baseline II &         4.6e-01, 3.3e-02 &         5.9e-01, 1.7e-02 &         4.5e-02, 2.6e-01 &         7.8e-01, 1.5e-02 &        9.8e-01, -4.9e-04 &        8.2e-01, -4.7e-02 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM Baseline I - 30 Hz       &         1.9e-10, 2.7e-01 &         8.8e-21, 2.0e-01 &        3.8e-02, -3.5e-01 &         2.9e-05, 3.8e-01 &         1.6e-15, 2.2e-01 &         2.9e-01, 3.2e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - Baseline II      &         3.0e-16, 2.6e-01 &         2.5e-09, 1.9e-01 &         3.5e-01, 1.7e-01 &         2.0e-15, 3.5e-01 &         1.3e-34, 2.1e-01 &         7.0e-01, 1.4e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
LMM 11 Hz - 30 Hz            &        1.4e-02, -5.2e-02 &        3.4e-02, -2.2e-02 &         4.2e-03, 3.2e-01 &        9.6e-02, -9.6e-02 &        1.0e-01, -2.0e-02 &        9.1e-01, -4.2e-02 &         3.0e-03, 3.2e-02 &         7.0e-01, 5.5e-02 &         1.3e-01, 8.2e-02 &         1.1e-08, 5.9e+00 &         1.7e-02, 6.8e-02 &        2.3e-01, -3.2e-01 \\
LMM Baseline II - 30 Hz      &         2.0e-12, 3.0e-01 &         1.1e-12, 2.1e-01 &        3.5e-01, -1.3e-01 &         4.1e-08, 4.2e-01 &         3.4e-22, 2.3e-01 &         5.3e-01, 1.9e-01 &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN &                      NaN \\
\bottomrule
\end{tabular}
