<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\begin{tabular}{ll}
\toprule
{} &amp;                     Fwhm \\
\midrule
Normality 11 Hz        &amp;          234.08, 1.5e-51 \\
Normality 30 Hz        &amp;          118.42, 1.9e-26 \\
Wilcoxon 11 Hz - 30 Hz &amp;  6488.00, 1.4e-20, (276) \\
\bottomrule
\end{tabular}
</pre></body></html>