\begin{tabular}{lllllllllllll}
\toprule
{} &                            Theta bandpower &                             Theta relpower &                              Theta relpeak &                                 Theta peak &                                 Theta freq &                           Theta half width &                             Stim bandpower &                              Stim relpower &                               Stim relpeak &                            Stim half width &                                 Stim p max &                              Stim strength \\
\midrule
Baseline I                            &                     2.2e-03 ± 2.2e-04 (46) &                     2.6e-01 ± 1.6e-02 (46) &                     6.5e+00 ± 6.7e-01 (46) &                     1.7e-03 ± 1.8e-04 (46) &                     7.8e+00 ± 4.0e-02 (46) &                     7.7e-01 ± 1.8e-02 (46) &                              nan ± nan (0) &                              nan ± nan (0) &                              nan ± nan (0) &                              nan ± nan (0) &                              nan ± nan (0) &                              nan ± nan (0) \\
11 Hz                                 &                     8.5e-04 ± 8.0e-05 (44) &                     8.6e-02 ± 4.6e-03 (44) &                     2.3e-01 ± 5.2e-02 (44) &                     3.2e-04 ± 3.1e-05 (44) &                     7.7e+00 ± 1.3e-01 (44) &                     1.7e+00 ± 3.0e-01 (43) &                     9.6e-04 ± 8.0e-05 (44) &                     1.1e-01 ± 7.4e-03 (44) &                     1.6e+01 ± 1.9e+00 (44) &                     3.4e-01 ± 2.5e-03 (44) &                     2.1e-03 ± 2.3e-04 (44) &                     3.3e+00 ± 3.8e-01 (44) \\
Baseline II                           &                     2.2e-03 ± 2.3e-04 (32) &                     2.7e-01 ± 1.7e-02 (32) &                     6.3e+00 ± 7.4e-01 (32) &                     1.6e-03 ± 2.1e-04 (32) &                     8.1e+00 ± 4.7e-02 (32) &                     8.4e-01 ± 3.2e-02 (32) &                              nan ± nan (0) &                              nan ± nan (0) &                              nan ± nan (0) &                              nan ± nan (0) &                              nan ± nan (0) &                              nan ± nan (0) \\
30 Hz                                 &                     5.3e-04 ± 6.3e-05 (34) &                     5.3e-02 ± 4.2e-03 (34) &                     3.0e-02 ± 5.3e-02 (34) &                     1.9e-04 ± 2.7e-05 (34) &                     7.4e+00 ± 1.4e-01 (34) &                     1.2e+01 ± 1.9e+00 (34) &                     1.8e-03 ± 3.3e-04 (34) &                     1.6e-01 ± 2.3e-02 (34) &                     8.6e+01 ± 1.4e+01 (34) &                     3.0e-01 ± 2.3e-03 (23) &                     5.3e-03 ± 1.1e-03 (34) &                     1.3e+01 ± 2.8e+00 (34) \\
Normality Baseline I                  &                           4.3e+01, 5.8e-10 &                           1.6e+00, 4.6e-01 &                           2.1e+00, 3.4e-01 &                           3.2e+01, 1.3e-07 &                           5.9e+00, 5.3e-02 &                           1.9e+00, 3.8e-01 &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN \\
Wilcoxon Baseline I 11 Hz             &                     3.5e+01, 7.9e-08, (44) &                     1.0e+00, 8.2e-09, (44) &                     2.0e+00, 8.7e-09, (44) &                     3.0e+00, 9.4e-09, (44) &                     3.6e+02, 4.7e-01, (44) &                     4.3e+02, 6.2e-01, (43) &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN \\
Paired summary Baseline I 11 Hz       &  2.2e-03 ± 2.3e-04, 8.5e-04 ± 8.0e-05 (44) &  2.6e-01 ± 1.6e-02, 8.6e-02 ± 4.6e-03 (44) &  6.3e+00 ± 6.7e-01, 2.3e-01 ± 5.2e-02 (44) &  1.6e-03 ± 1.9e-04, 3.2e-04 ± 3.1e-05 (44) &  7.8e+00 ± 4.2e-02, 7.7e+00 ± 1.3e-01 (44) &  7.8e-01 ± 1.8e-02, 1.7e+00 ± 3.0e-01 (43) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) \\
Wilcoxon Baseline I Baseline II       &                     2.4e+02, 7.1e-01, (32) &                     2.4e+02, 7.1e-01, (32) &                     2.4e+02, 5.9e-01, (32) &                     2.3e+02, 5.5e-01, (32) &                     6.0e+00, 9.0e-06, (32) &                     1.4e+02, 2.3e-02, (32) &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN \\
Paired summary Baseline I Baseline II &  2.3e-03 ± 2.8e-04, 2.2e-03 ± 2.3e-04 (32) &  2.7e-01 ± 1.8e-02, 2.7e-01 ± 1.7e-02 (32) &  6.6e+00 ± 8.1e-01, 6.3e+00 ± 7.4e-01 (32) &  1.7e-03 ± 2.3e-04, 1.6e-03 ± 2.1e-04 (32) &  7.8e+00 ± 4.4e-02, 8.1e+00 ± 4.7e-02 (32) &  7.6e-01 ± 2.0e-02, 8.4e-01 ± 3.2e-02 (32) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) \\
Wilcoxon Baseline I 30 Hz             &                     6.0e+00, 1.4e-06, (32) &                     0.0e+00, 8.0e-07, (32) &                     0.0e+00, 8.0e-07, (32) &                     0.0e+00, 8.0e-07, (32) &                     9.5e+01, 1.6e-03, (32) &                     7.1e+01, 3.1e-04, (32) &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN \\
Paired summary Baseline I 30 Hz       &  2.3e-03 ± 2.8e-04, 5.4e-04 ± 6.6e-05 (32) &  2.7e-01 ± 1.8e-02, 5.5e-02 ± 4.2e-03 (32) &  6.6e+00 ± 8.1e-01, 4.9e-02 ± 5.4e-02 (32) &  1.7e-03 ± 2.3e-04, 1.9e-04 ± 2.8e-05 (32) &  7.8e+00 ± 4.4e-02, 7.3e+00 ± 1.4e-01 (32) &  7.6e-01 ± 2.0e-02, 1.2e+01 ± 2.0e+00 (32) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) \\
Normality 11 Hz                       &                           2.1e+01, 2.6e-05 &                           5.6e+00, 6.2e-02 &                           1.2e+01, 2.3e-03 &                           2.4e+01, 5.3e-06 &                           1.9e+00, 3.9e-01 &                           1.0e+01, 5.5e-03 &                           1.7e+01, 1.8e-04 &                           3.9e+00, 1.4e-01 &                           5.8e+00, 5.6e-02 &                           1.6e+01, 4.2e-04 &                           1.5e+01, 5.8e-04 &                           1.2e+01, 2.3e-03 \\
Wilcoxon 11 Hz Baseline II            &                     1.2e+01, 2.5e-06, (32) &                     2.0e+00, 9.6e-07, (32) &                     0.0e+00, 8.0e-07, (32) &                     3.0e+00, 1.1e-06, (32) &                     1.2e+02, 9.3e-03, (32) &                     2.3e+02, 6.7e-01, (31) &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN \\
Paired summary 11 Hz Baseline II      &  8.2e-04 ± 8.8e-05, 2.2e-03 ± 2.3e-04 (32) &  8.4e-02 ± 4.5e-03, 2.7e-01 ± 1.7e-02 (32) &  2.0e-01 ± 5.0e-02, 6.3e+00 ± 7.4e-01 (32) &  3.0e-04 ± 3.1e-05, 1.6e-03 ± 2.1e-04 (32) &  7.6e+00 ± 1.5e-01, 8.1e+00 ± 4.7e-02 (32) &  1.5e+00 ± 3.5e-01, 8.6e-01 ± 2.5e-02 (31) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) \\
Wilcoxon 11 Hz 30 Hz                  &                     1.1e+02, 3.3e-03, (32) &                     4.1e+01, 3.0e-05, (32) &                     1.3e+02, 1.4e-02, (32) &                     1.2e+02, 5.6e-03, (32) &                     1.2e+02, 4.5e-02, (32) &                     6.7e+01, 3.9e-04, (31) &                     2.1e+02, 2.9e-01, (32) &                     2.0e+02, 2.2e-01, (32) &                     3.0e+01, 1.2e-05, (32) &                     0.0e+00, 9.5e-07, (21) &                     1.6e+02, 5.0e-02, (32) &                     8.8e+01, 1.0e-03, (32) \\
Paired summary 11 Hz 30 Hz            &  8.2e-04 ± 8.8e-05, 5.4e-04 ± 6.6e-05 (32) &  8.4e-02 ± 4.5e-03, 5.5e-02 ± 4.2e-03 (32) &  2.0e-01 ± 5.0e-02, 4.9e-02 ± 5.4e-02 (32) &  3.0e-04 ± 3.1e-05, 1.9e-04 ± 2.8e-05 (32) &  7.6e+00 ± 1.5e-01, 7.3e+00 ± 1.4e-01 (32) &  1.5e+00 ± 3.5e-01, 1.1e+01 ± 2.0e+00 (31) &  9.7e-04 ± 9.3e-05, 1.8e-03 ± 3.4e-04 (32) &  1.1e-01 ± 8.6e-03, 1.6e-01 ± 2.4e-02 (32) &  1.8e+01 ± 2.4e+00, 8.5e+01 ± 1.4e+01 (32) &  3.4e-01 ± 3.6e-03, 3.0e-01 ± 2.3e-03 (21) &  2.1e-03 ± 2.7e-04, 5.4e-03 ± 1.1e-03 (32) &  3.5e+00 ± 4.9e-01, 1.3e+01 ± 3.0e+00 (32) \\
Normality Baseline II                 &                           1.4e+01, 1.1e-03 &                           3.6e-01, 8.3e-01 &                           4.9e+00, 8.8e-02 &                           2.5e+01, 3.4e-06 &                           4.7e+00, 9.7e-02 &                           1.6e+01, 2.8e-04 &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN \\
Wilcoxon Baseline II 30 Hz            &                     1.6e+01, 3.5e-06, (32) &                     0.0e+00, 8.0e-07, (32) &                     0.0e+00, 8.0e-07, (32) &                     3.0e+00, 1.1e-06, (32) &                     5.0e+01, 9.9e-05, (32) &                     7.5e+01, 4.1e-04, (32) &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN &                                        NaN \\
Paired summary Baseline II 30 Hz      &  2.2e-03 ± 2.3e-04, 5.4e-04 ± 6.6e-05 (32) &  2.7e-01 ± 1.7e-02, 5.5e-02 ± 4.2e-03 (32) &  6.3e+00 ± 7.4e-01, 4.9e-02 ± 5.4e-02 (32) &  1.6e-03 ± 2.1e-04, 1.9e-04 ± 2.8e-05 (32) &  8.1e+00 ± 4.7e-02, 7.3e+00 ± 1.4e-01 (32) &  8.4e-01 ± 3.2e-02, 1.2e+01 ± 2.0e+00 (32) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) &                   nan ± nan, nan ± nan (0) \\
Normality 30 Hz                       &                           3.1e+01, 1.9e-07 &                           7.9e+00, 2.0e-02 &                           1.2e+01, 2.3e-03 &                           3.8e+01, 5.3e-09 &                           7.2e+00, 2.8e-02 &                           1.9e+02, 2.2e-41 &                           1.7e+01, 1.7e-04 &                           1.5e+01, 4.8e-04 &                           6.2e+00, 4.5e-02 &                           6.1e-01, 7.4e-01 &                           1.9e+01, 6.3e-05 &                           4.3e+01, 5.1e-10 \\
\bottomrule
\end{tabular}
